		
     You are seeing this message because you had 
trouble in your attempt to sign-on to this system.
     If you have forgotten your password, you must 
send a Self Addressed, Stamped Envelope to the 
address below.  Include your phone number, FOG 
membership number (if your are a member), and any 
other information which may assist me in verifying 
your right to this information.
     This procedure is necessary to protect all 
users as well as this system from abuse.

     If you have any other question, you may call 
the FOG office at (415) 755-4140 (11:00am to 6:00pm 
Monday through Friday).  DO NOT USE THIS NUMBER IF
YOU HAVE FORGOTTEN YOUR PASSWORD.

                      -- Gale Rhoades, SYSOP
