FEBRUARY 25, 1984:
     Slowly but surely we are getting back to 
normal.  We have FINALLY solved the problems with 
the hard disks (both for the RCP/Ms and for the 
CompuPro we use in the office).  The problem had to 
do with a missing gasket in the drives (all were 
from the same manufacturer).
     System #3 will not go back on line until I get 
some of the other things caught up -- It takes 
between 10 and 20 uninterrupted hours to restore the 
whole system from the backups and update the files.
     I have finally got the materials off to rest of 
the SYSOPs of the FOG boards.  They will now be able 
to get themselves on line at long last.
     Please help me get this system in order by 
leaving me a message if you see something that is 
not quite right or find something missing.  I will 
correct the problems as quickly as possible.
                          Gale Rhoades, SYSOP
